)^2c

) (GeV/ +πd Invariant mass (

2 2.01 2.02 2.03 2.04 2.05 2.06 2.07 2.08 2.09

)^2c

Counts/(4 MeV/

500 1000

1500

2000

2500

3000

nΛ = 2.76 TeV NNs Pb-Pb (0-10% central)

ALICE